/*
Navicat MySQL Data Transfer

Source Server         : localhost_3306
Source Server Version : 50540
Source Host           : localhost:3306
Source Database       : building

Target Server Type    : MYSQL
Target Server Version : 50540
File Encoding         : 65001

Date: 2017-08-23 17:32:15
*/

SET FOREIGN_KEY_CHECKS=0;

-- ----------------------------
-- Table structure for bd_hot_search
-- ----------------------------
DROP TABLE IF EXISTS `bd_hot_search`;
CREATE TABLE `bd_hot_search` (
  `id` int(11) NOT NULL AUTO_INCREMENT,
  `keyword` varchar(64) NOT NULL,
  `create_at` int(11) NOT NULL,
  `updated_at` int(11) DEFAULT NULL,
  `status` tinyint(4) NOT NULL,
  PRIMARY KEY (`id`)
) ENGINE=MyISAM AUTO_INCREMENT=20 DEFAULT CHARSET=utf8;
