/*
Navicat MySQL Data Transfer

Source Server         : localhost_3306
Source Server Version : 50540
Source Host           : localhost:3306
Source Database       : building

Target Server Type    : MYSQL
Target Server Version : 50540
File Encoding         : 65001

Date: 2017-08-17 18:40:58
*/

SET FOREIGN_KEY_CHECKS=0;

-- ----------------------------
-- Table structure for bd_reply
-- ----------------------------
DROP TABLE IF EXISTS `bd_reply`;
CREATE TABLE `bd_reply` (
  `id` int(11) NOT NULL AUTO_INCREMENT,
  `cid` int(11) NOT NULL COMMENT '评价id',
  `from_userid` int(11) NOT NULL COMMENT '回复人',
  `to_userid` int(11) NOT NULL COMMENT '被回复人',
  `content` text NOT NULL COMMENT '回复内容',
  `created_at` int(11) NOT NULL,
  `status` tinyint(4) NOT NULL,
  PRIMARY KEY (`id`)
) ENGINE=MyISAM AUTO_INCREMENT=11 DEFAULT CHARSET=utf8 COMMENT='评价回复表';
