/*
Navicat MySQL Data Transfer

Source Server         : localhost_3306
Source Server Version : 50540
Source Host           : localhost:3306
Source Database       : building

Target Server Type    : MYSQL
Target Server Version : 50540
File Encoding         : 65001

Date: 2017-07-27 10:37:50
*/

SET FOREIGN_KEY_CHECKS=0;

-- ----------------------------
-- Table structure for bd_advert
-- ----------------------------
DROP TABLE IF EXISTS `bd_advert`;
CREATE TABLE `bd_advert` (
  `id` int(11) NOT NULL AUTO_INCREMENT,
  `name` varchar(64) DEFAULT NULL COMMENT '图片名称',
  `link` varchar(255) DEFAULT NULL COMMENT '链接地址',
  `imgurl` text NOT NULL COMMENT '广告图片/内容',
  `orderby` smallint(6) DEFAULT '10',
  `created_at` int(11) DEFAULT '0' COMMENT '添加时间',
  `updated_at` int(11) DEFAULT NULL COMMENT '修改时间',
  `created_author` int(11) DEFAULT NULL,
  `click_count` mediumint(8) DEFAULT '0',
  `status` tinyint(4) DEFAULT '0',
  `updated_author` int(11) DEFAULT NULL,
  PRIMARY KEY (`id`)
) ENGINE=MyISAM AUTO_INCREMENT=6 DEFAULT CHARSET=utf8 COMMENT='广告表';
