/*
Navicat MySQL Data Transfer

Source Server         : localhost_3306
Source Server Version : 50540
Source Host           : localhost:3306
Source Database       : building

Target Server Type    : MYSQL
Target Server Version : 50540
File Encoding         : 65001

Date: 2017-07-27 16:29:55
*/

SET FOREIGN_KEY_CHECKS=0;

-- ----------------------------
-- Table structure for bd_aboutwe
-- ----------------------------
DROP TABLE IF EXISTS `bd_aboutwe`;
CREATE TABLE `bd_aboutwe` (
  `id` int(11) unsigned NOT NULL AUTO_INCREMENT,
  `address` varchar(255) DEFAULT NULL,
  `tell` varchar(255) DEFAULT NULL,
  `content` text,
  `wechat` varchar(255) DEFAULT NULL,
  `email` varchar(255) DEFAULT NULL COMMENT '是否显示',
  `updated_at` int(11) DEFAULT NULL,
  `coordinate` varchar(255) DEFAULT NULL,
  `company` varchar(255) DEFAULT NULL,
  PRIMARY KEY (`id`)
) ENGINE=MyISAM AUTO_INCREMENT=5 DEFAULT CHARSET=utf8 COMMENT='关于我们';
